14.45

14.5

14.55

14.6

14.65

14.7

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 Bunch current (mA)

Temp. (C)

LER tmp(10): T(i)=14.5241 + 0.158712 i^2 HER tmp(10): T(i)=14.5187 + 0.193524 i^2