13.5

13.6

13.7

13.8

13.9

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 Bunch current (mA)

Temp. (C)

LER tmp(19): T(i)=13.5277 + 0.27911 i^2 HER tmp(19): T(i)=13.5552 + 0.522598 i^2