14.7

14.75

14.8

14.85

14.9

14.95 15 15.05

15.1

15.15

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 Bunch current (mA)

Temp. (C)

LER tmp(27): T(i)=14.831 + 0.291293 i^2 HER tmp(27): T(i)=14.8381 + 0.216405 i^2