14.45

14.5

14.55

14.6

14.65

14.7

14.75

0 0.2 0.4 0.6 0.8 1 Current (A)

Temp. (C)

LER tmp(12): T(I)=14.5499 + 0.116717 I^2 HER tmp(12): T(I)=14.5773 + 0.210313 I^2