13.8

13.9 14 14.1

14.2

14.3

0 0.2 0.4 0.6 0.8 1 Current (A)

Temp. (C)

LER tmp(18): T(I)=13.861 + 0.211917 I^2 HER tmp(18): T(I)=13.9459 + 1.01908 I^2