13.5

13.6

13.7

13.8

13.9

0 0.2 0.4 0.6 0.8 1 Current (A)

Temp. (C)

LER tmp(19): T(I)=13.5277 + 0.198282 I^2 HER tmp(19): T(I)=13.5553 + 0.940985 I^2