14.2

14.4

14.6

14.8 15 15.2

15.4

0 0.2 0.4 0.6 0.8 1 Current (A)

Temp. (C)

LER tmp(24): T(I)=14.2441 + 1.16171 I^2 HER tmp(24): T(I)=14.2719 + 1.76551 I^2