14.85

14.9

14.95 15 15.05

15.1

15.15

15.2

0 0.2 0.4 0.6 0.8 1 Current (A)

Temp. (C)

LER tmp(26): T(I)=14.9623 + 0.181333 I^2 HER tmp(26): T(I)=14.9862 + 0.315479 I^2