14.7

14.75

14.8

14.85

14.9

14.95 15 15.05

15.1

15.15

0 0.2 0.4 0.6 0.8 1 Current (A)

Temp. (C)

LER tmp(27): T(I)=14.8309 + 0.206993 I^2 HER tmp(27): T(I)=14.838 + 0.390055 I^2