14.9

15

15.1

15.2

15.3

0 0.2 0.4 0.6 0.8 1 Current (A)

Temp. (C)

LER tmp(28): T(I)=14.9733 + 0.321074 I^2 HER tmp(28): T(I)=14.9712 + 0.526508 I^2