13.25

13.275

13.3

13.325

13.35

13.375

13.4

13.425

13.45

13.475

0 0.2 0.4 0.6 0.8 1 Current (A)

Temp. (C)

LER tmp(33): T(I)=13.3403 + 0.0364844 I^2 HER tmp(33): T(I)=13.329 + 0.160386 I^2