14.5

14.6

14.7

14.8

14.9 15 15.1

0 0.2 0.4 0.6 0.8 1 Current (A)

Temp. (C)

LER tmp(36): T(I)=14.587 + 0.505886 I^2 HER tmp(36): T(I)=14.6331 + 0.846999 I^2