13.3

13.35

13.4

13.45

13.5

13.55

13.6

0 0.2 0.4 0.6 0.8 1 Current (A)

Temp. (C)

LER tmp(44): T(I)=13.4118 + 0.0410548 I^2 HER tmp(44): T(I)=13.3913 + 0.449338 I^2