13.7

13.8

13.9 14 14.1

14.2

14.3

14.4

0 0.2 0.4 0.6 0.8 1 Current (A)

Temp. (C)

LER tmp(8): T(I)=13.7608 + 0.678079 I^2 HER tmp(8): T(I)=13.7486 + 1.27011 I^2