0 0.2 0.4 0.6 0.8 1 1.2 1.4

0 200 400 600 800 1000 1200

Single Beam Study: dT (Centre-Al Bwd) HER dT_0=1.63 K LER dT_0=1.44 K

I (mA) dT-dT_0 (K)