12.2

12.4

12.6

12.8 13 13.2

13.4

13.6

-10 0 10 20 30 40 50

7.305 / 19 P1 12.30 P2 0.2065 P3 31.75 P4 -18.56 P5 1.155

T(RF)=P1 + P2 (cos 2π/P3 (RF-P4) + P5)^2

RF phase (deg)

Temp. (C)