summary Entries 6336 Mean 2.069 RMS 0.3268 / ndf

2χ 29.83 / 6 Constant 16.8±

973.1 Mean 0.004688 ± 1.986 Sigma 0.003583 ± 0.2266

(in fA)

0 1 2 3 4 5 0

200

400

600

800

1000

± ± ± ±

I_leak, 30JUN04, CAP1_11