summary Entries 6336 Mean 1.701 RMS 0.2932 / ndf

2χ 11.86 / 4 Constant 19.72±

1057 Mean 0.004553 ± 1.624 Sigma 0.004598 ± 0.2132

(in fA)

0 0.5 1 1.5 2 2.5 3 3.5 0

200

400

600

800

1000

± ± ± ±

I_leak, 30JUN04, CAP1_08