summary Entries 6336 Mean 15.38 RMS 2.24 / ndf

2χ 85.12 / 52 Constant 2.649±

141.4 Mean 0.02835 ± 14.81 Sigma 0.03158 ± 1.618

(in e-)

10 15 20 25 30 0 20 40 60 80 100 120 140 160

± ± ± ± noise, 30JUN04, CAP1_08