summary Entries 6336 Mean 1.72 RMS 0.3068 / ndf

2χ 17.56 / 4 Constant 19.58±

1057 Mean 0.004718 ± 1.638 Sigma 0.00446 ± 0.2096

(in fA)

0 1 2 3 4 0

200

400

600

800

1000

± ± ± ±

I_leak, 30JUN04, CAP1_09