summary Entries 6336 Mean 15.68 RMS 2.285 / ndf

2χ 51.39 / 42 Constant 2.817±

141.4 Mean 0.03437 ± 15 Sigma 0.0422±

1.565

(in e-)

10 15 20 25 30 35 0 20 40 60 80 100 120 140 160

± ± noise, 28JUN04, CAP1_11