0 1 2 3 4 5

1 10 10^2_{time (days)}

Voltage drop (V)

Annealing

k1 New k2 New k1 Old k2 Old k2 Broken

4.12447+0.796603 exp(-t/4.18636) 3.97587+0.816532 exp(-t/3.83297)