0 50 100 150 200 250 300 350 400 450 500

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

SVD1.4 RadFET Calibration function Old: dose = 13.66V+15.59V^2-1.985V^3+0.14376V^4 New: dose = 58.7517V+18.4065V^2

Voltage drop (V)

Accumulated dose (kRad)