0

0.2

0.4

0.6

0.8

1

0 20 40 60 80 100 120 140 160 180 Time (days)

Relative voltage drop (V)

Total annealing 36% in 180 days at room temp.

0.61+0.19 exp(-t/3.52)+0.16 exp(-t/59)

0.79+0.14 exp(-t/81.5)

0 10 20 30 40 50 60

0 20 40 60 80 100 120 140 160 180

Temperature (deg. C)