-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25

4 6 8 10 12 14 16 18 20

Temperature (C)

Voltage (V)

RadFETs (2MRad on 20030520) on 20030609

New RadFETs

(Voltages at lowest temp. subtracted)