-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25

5 7.5 10 12.5 15 17.5 20 22.5 25

Temperature (C)

Voltage (V)

RadFETs (2MRad on 20030520) on 20030711

(Voltages at lowest temp. subtracted)