0 2.5 5 7.5 10 12.5 15 17.5 20

2000 2002.5 2005 2007.5 2010 Year

Peak luminosity (10^{33} cm^{-2}s^{-1} )

Increase of Peak Luminosity 1.1242 10^{34}/cm^2/s on 2006/6/28 (PEP-II)

2.1083 10^{34}/cm^2/s on 2009/6/17 (KEKB)